i_cn cn phase_one_connect

i_cn_dn dn

i_cn_rs dn register_watch

i_cn_dn_rs rs clear_store pe/od/or/oc

i_cn_rs_dn dn i_cn_rs_rs rs clear_store

i_cn_rs_rf rf clear_store

i_cn_dn_rs_rs rs/rf phase_one_disconnect rf clear_store od/or/oc

i_cn_rs_dn_rs rs unregister_watch od/or/oc

i_cn_rs_rs_dn dn i_cn_rs_rs_rs rs test_other_state

i_cn_rs_rs_rf rf unregister_watch

dn i_cn_rs_rf_rs rs/rf phase_one_disconnect rs complete_disconnect

rs clear_store od/or/oc rs/rf unregister_watch od/or/oc dn unregister_watch ou/oc

i_cn_rs_rs_rs_od od/or write_ready

rs clear_store

dn od/or/oc

dn i_cn_rs_rf_rs_rs rs dn rf unregister_watch od/or/oc

i_cn_rs_rs_rs_od_rs rs test_other_state dn complete_disconnect

dn unregister_watch od

i_cn_rs_rs_rs_od_rs_or or/oc write_connected

dn rf unregister_watch od/or/oc

i_cn_rs_rs_rs_od_rs_or_rs rs test_other_state od clear_store

dn unregister_watch or

i_cn_rs_rs_rs_od_rs_or_rs_oc oc phase_two_connect rf clear_store

i_cn_rs_rs_rs_od_rs_or_rs_oc_pe pe/od/or/oc

i_cn_rs_rs_rs_od_rs_or_rs_oc_dn dn i_cn_rs_rs_rs_od_rs_or_rs_oc_rs rs rs phase_two_disconnect rf clear_store

pe/od/or/oc

dn

rf unregister_watch rs phase_two_disconnect pe/od/or/oc pe/od/or/oc phase_two_disconnect

dn phase_two_disconnect